Paul (father of Peter of Callinicum) - ܦܘܠܐ
edition published: 2024-02-16-06:00
language: en
availability: Distributed under a Creative Commons Attribution 4.0 International License. (http://creativecommons.org/licenses/by/4.0/)

Paul (father of Peter of Callinicum); ܦܘܠܐ
identifier: http://syriaca.org/person/5131
identifier: http://syriaca.org/johnofephesus/persons/5131
Joh. Eph., EH 4.45, mentions that Peter of Callinicum, the miaphysite patriarch of Antioch, was the son of a certain Paul.
floruit: mid-6th century
male
228 3.4.45
228